SPM mip[0, 0, 0]

         <

         < <

                 SPM{T_{42}}

        CB (masked [incl.] by mask.nii)

SPMresults:.\VBM\Paper\05Jan\CBAlone

Height threshold T = 5.166740  {p<0.05 (FWE)}
Extent threshold k = 0 voxels
                                             Design matrix

                                                 0.5 1 1.5 2 2.5

                                                 5
                                                10
                                                15
                                                20
                                                25
                                                30
                                                35
                                                40

                                               contrast

1